-- RedefineTables
PRAGMA defer_foreign_keys=ON;
PRAGMA foreign_keys=OFF;
CREATE TABLE "new_Human" (
    "key" TEXT NOT NULL PRIMARY KEY,
    "name" TEXT NOT NULL DEFAULT ''
);
INSERT INTO "new_Human" ("key", "name") SELECT "key", "name" FROM "Human";
DROP TABLE "Human";
ALTER TABLE "new_Human" RENAME TO "Human";
PRAGMA foreign_keys=ON;
PRAGMA defer_foreign_keys=OFF;
